From 926a569ee455911ed6752750b9715d9bdf689504 Mon Sep 17 00:00:00 2001
From: Albert <albert.tests@gmail.com>
Date: Sun, 20 Oct 2013 18:22:13 +0200
Subject: Build problem with unistd.h and Cygwin The standard g++ compiler
 under windows (win32-g++) has unistd.gh file; Microsoft windows does not have
 it, therfore it is better to use the winbuild directory in case of windows
 adn no dependency otherwise

---
 src/libdoxygen.pro.in   | 2 --
 winbuild/Doxygen.vcproj | 2 +-
 2 files changed, 1 insertion(+), 3 deletions(-)

diff --git a/src/libdoxygen.pro.in b/src/libdoxygen.pro.in
index 393f72d..96b7b9e 100644
--- a/src/libdoxygen.pro.in
+++ b/src/libdoxygen.pro.in
@@ -133,8 +133,6 @@ HEADERS      =	arguments.h \
 		tooltip.h \
 		translator.h \
 		translator_adapter.h \
-		types.h \
-		unistd.h \
 		util.h \
 		version.h \
 		vhdlcode.h \
diff --git a/winbuild/Doxygen.vcproj b/winbuild/Doxygen.vcproj
index b687c4c..a632c5b 100644
--- a/winbuild/Doxygen.vcproj
+++ b/winbuild/Doxygen.vcproj
@@ -2798,7 +2798,7 @@
 				>
 			</File>
 			<File
-				RelativePath="..\src\unistd.h"
+				RelativePath="..\winbuild\unistd.h"
 				>
 				<FileConfiguration
 					Name="Debug|Win32"
-- 
cgit v0.12

