From ac303e2ff9e3a66cbe128c30c2986ed92851ceb6 Mon Sep 17 00:00:00 2001
From: albert-github <albert.tests@gmail.com>
Date: Wed, 11 Dec 2019 20:32:22 +0100
Subject: issue #7436 Incorrect handling of block comments in VHDL

Added some documentation
---
 doc/docblocks.doc | 3 +++
 1 file changed, 3 insertions(+)

diff --git a/doc/docblocks.doc b/doc/docblocks.doc
index 9d14f6e..a427b76 100644
--- a/doc/docblocks.doc
+++ b/doc/docblocks.doc
@@ -513,6 +513,9 @@ Here is an example VHDL file with doxygen comments:
  for the corresponding \mbox{\LaTeX} documentation that is generated by doxygen.
  \endlatexonly
 
+As of VHDL 2008 it is also to use `/&zwj;*` type comments. Doxygen will handle `/&zwj;* ... *&zwj;/`
+as plain comments and `/&zwj;*! ... *&zwj;/` comments as special doxygen comments with documentaton.
+
 To get proper looking output you need to set
 \ref cfg_optimize_output_vhdl "OPTIMIZE_OUTPUT_VHDL" to \c YES in the
 configuration file. This will also affect a number of other settings. When they
-- 
cgit v0.12

