From 41ab151f606b257395e8e1e58d3c348ee67d833b Mon Sep 17 00:00:00 2001
From: Hiroyuki Iwatsuki <don@na.rim.or.jp>
Date: Sat, 28 Apr 2012 10:57:06 +0900
Subject: Fix a link to Google+.

---
 doc/manual.asciidoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

diff --git a/doc/manual.asciidoc b/doc/manual.asciidoc
index 5a2ae22..fcabdc9 100644
--- a/doc/manual.asciidoc
+++ b/doc/manual.asciidoc
@@ -155,7 +155,7 @@ of the Chrome and v8 world.
 
 * For Chrome (~30k source files), Ninja reduced no-op builds from
   around 15 seconds to under one second.
-* https://plus.sandbox.google.com/108996039294665965197/posts/SfhrFAhRyyd[A
+* https://plus.google.com/108996039294665965197/posts/SfhrFAhRyyd[A
   Mozilla developer compares build systems]: "While chromium's full
   build is 2.15x slower than firefox's, a nop build is 78.2x faster!
   That is really noticeable during development. No incremental build
-- 
cgit v0.12

