From 5bda4e27bbe3fde98bd5c628fada76dfccadad0e Mon Sep 17 00:00:00 2001
From: Jens Bache-Wiig <jbache@trolltech.com>
Date: Thu, 21 Jan 2010 11:31:50 +0100
Subject: Remove statusbaritem on Mac OSX

The statusbar item should not draw a frame on Mac OSX.
The current frame is essentially redundant and results
in non-native appearance on Mac.

Task-number: QTBUG-3574
Reviewed-by: morten
---
 src/gui/styles/qmacstyle_mac.mm | 1 -
 1 file changed, 1 deletion(-)

diff --git a/src/gui/styles/qmacstyle_mac.mm b/src/gui/styles/qmacstyle_mac.mm
index 51c2a96..0e0a9ca 100644
--- a/src/gui/styles/qmacstyle_mac.mm
+++ b/src/gui/styles/qmacstyle_mac.mm
@@ -3132,7 +3132,6 @@ void QMacStyle::drawPrimitive(PrimitiveElement pe, const QStyleOption *opt, QPai
         p->drawLine(opt->rect.topLeft(), opt->rect.bottomLeft());
         } break;
     case PE_FrameStatusBarItem:
-        QCommonStyle::drawPrimitive(pe, opt, p, w);
         break;
     case PE_IndicatorTabClose: {
         bool hover = (opt->state & State_MouseOver);
-- 
cgit v0.12

