From e12b9f63ecf93b51262119d11f85f3c18bad30e3 Mon Sep 17 00:00:00 2001
From: "Andrew M. Kuchling" <amk@amk.ca>
Date: Fri, 18 Aug 2006 13:54:33 +0000
Subject: Minor edits

---
 Doc/api/abstract.tex | 2 +-
 Doc/api/concrete.tex | 4 ++--
 2 files changed, 3 insertions(+), 3 deletions(-)

diff --git a/Doc/api/abstract.tex b/Doc/api/abstract.tex
index 2ea11d1..1a498b9 100644
--- a/Doc/api/abstract.tex
+++ b/Doc/api/abstract.tex
@@ -6,7 +6,7 @@ numerical types, or all sequence types).  When used on object types
 for which they do not apply, they will raise a Python exception.
 
 It is not possible to use these functions on objects that are not properly
-initialized, such a list object that has been created by
+initialized, such as a list object that has been created by
 \cfunction{PyList_New()}, but whose items have not been set to some
 non-\code{NULL} value yet.
 
diff --git a/Doc/api/concrete.tex b/Doc/api/concrete.tex
index 3a31287..34221ad 100644
--- a/Doc/api/concrete.tex
+++ b/Doc/api/concrete.tex
@@ -1842,8 +1842,8 @@ format.
   failure.
   \note{If \var{length} is greater than zero, the returned list object's
         items are set to \code{NULL}.  Thus you cannot use abstract
-        API functions such as \cfunction{PySequence_SetItem()} on it
-        or expose it to Python code before setting all items to a
+        API functions such as \cfunction{PySequence_SetItem()} 
+        or expose the object to Python code before setting all items to a
         real object with \cfunction{PyList_SetItem()}.}
 \end{cfuncdesc}
 
-- 
cgit v0.12

