From e8de31cbd094bf9e909e1cb12a19c6c3ca854dd7 Mon Sep 17 00:00:00 2001
From: Fred Drake <fdrake@acm.org>
Date: Thu, 31 Aug 2000 05:38:39 +0000
Subject: Add a comment explaining the return value of PyOS_CheckStack().

---
 Python/pythonrun.c | 5 ++++-
 1 file changed, 4 insertions(+), 1 deletion(-)

diff --git a/Python/pythonrun.c b/Python/pythonrun.c
index 8f7fc0c..48a033f 100644
--- a/Python/pythonrun.c
+++ b/Python/pythonrun.c
@@ -903,7 +903,7 @@ run_pyc_file(FILE *fp, char *filename, PyObject *globals, PyObject *locals)
 	PyCodeObject *co;
 	PyObject *v;
 	long magic;
-	long PyImport_GetMagicNumber();
+	long PyImport_GetMagicNumber(void);
 
 	magic = PyMarshal_ReadLongFromFile(fp);
 	if (magic != PyImport_GetMagicNumber()) {
@@ -1201,6 +1201,9 @@ Py_FdIsInteractive(FILE *fp, char *filename)
 #include <malloc.h>
 #include <excpt.h>
 
+/*
+ * Return non-zero when we run out of memory on the stack; zero otherwise.
+ */
 int
 PyOS_CheckStack()
 {
-- 
cgit v0.12

