From d68d3ee3dd504661a6f5b0f5810211fef814b919 Mon Sep 17 00:00:00 2001
From: Neil Schemenauer <nascheme@enme.ucalgary.ca>
Date: Tue, 8 Jun 2004 02:58:50 +0000
Subject: Note that memory returned by PyBuffer_New is not specifically
 aligned. Closes SF bug #472568.

---
 Doc/api/concrete.tex | 4 +++-
 1 file changed, 3 insertions(+), 1 deletion(-)

diff --git a/Doc/api/concrete.tex b/Doc/api/concrete.tex
index c9ca1e7..63f9667 100644
--- a/Doc/api/concrete.tex
+++ b/Doc/api/concrete.tex
@@ -1565,7 +1565,9 @@ format.
 \begin{cfuncdesc}{PyObject*}{PyBuffer_New}{int size}
   Returns a new writable buffer object that maintains its own memory
   buffer of \var{size} bytes.  \exception{ValueError} is returned if
-  \var{size} is not zero or positive.
+  \var{size} is not zero or positive.  Note that the memory buffer (as
+  returned by \cfunction{PyObject_AsWriteBuffer()}) is not specifically
+  aligned.
 \end{cfuncdesc}
 
 
-- 
cgit v0.12

