From 393ac22b730200cc13599de4001b40b9871eae1b Mon Sep 17 00:00:00 2001
From: Georg Brandl <georg@python.org>
Date: Wed, 8 Nov 2006 07:45:59 +0000
Subject: Patch #1592072: fix docs for return value of PyErr_CheckSignals.

---
 Doc/api/exceptions.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

diff --git a/Doc/api/exceptions.tex b/Doc/api/exceptions.tex
index 057c1da..2dabeee 100644
--- a/Doc/api/exceptions.tex
+++ b/Doc/api/exceptions.tex
@@ -328,7 +328,7 @@ for each thread.
   default effect for \constant{SIGINT}\ttindex{SIGINT} is to raise the
   \withsubitem{(built-in exception)}{\ttindex{KeyboardInterrupt}}
   \exception{KeyboardInterrupt} exception.  If an exception is raised
-  the error indicator is set and the function returns \code{1};
+  the error indicator is set and the function returns \code{-1};
   otherwise the function returns \code{0}.  The error indicator may or
   may not be cleared if it was previously set.
 \end{cfuncdesc}
-- 
cgit v0.12

