From 9c65202f49d0a10367b53c10cb1552b09d985d9c Mon Sep 17 00:00:00 2001
From: Georg Brandl <georg@python.org>
Date: Mon, 20 Feb 2006 12:15:26 +0000
Subject: Bug #1323369: document possible values of sys.getwindowsversion()
 platform field

---
 Doc/lib/libsys.tex | 8 ++++----
 1 file changed, 4 insertions(+), 4 deletions(-)

diff --git a/Doc/lib/libsys.tex b/Doc/lib/libsys.tex
index 4efe5f6..4754107 100644
--- a/Doc/lib/libsys.tex
+++ b/Doc/lib/libsys.tex
@@ -271,10 +271,10 @@ It is always available.
   \var{platform} may be one of the following values:
 
   \begin{tableii}{l|l}{constant}{Constant}{Platform}
-    \lineii{VER_PLATFORM_WIN32s}       {Win32s on Windows 3.1}
-    \lineii{VER_PLATFORM_WIN32_WINDOWS}{Windows 95/98/ME}
-    \lineii{VER_PLATFORM_WIN32_NT}     {Windows NT/2000/XP}
-    \lineii{VER_PLATFORM_WIN32_CE}     {Windows CE}
+    \lineii{0 (VER_PLATFORM_WIN32s)}       {Win32s on Windows 3.1}
+    \lineii{1 (VER_PLATFORM_WIN32_WINDOWS)}{Windows 95/98/ME}
+    \lineii{2 (VER_PLATFORM_WIN32_NT)}     {Windows NT/2000/XP}
+    \lineii{3 (VER_PLATFORM_WIN32_CE)}     {Windows CE}
   \end{tableii}
 
   This function wraps the Win32 \cfunction{GetVersionEx()} function;
-- 
cgit v0.12

