From b6ce6427e832a6cddb0abb35cfa898632c6d5e96 Mon Sep 17 00:00:00 2001
From: Fred Drake <fdrake@acm.org>
Date: Mon, 19 Jan 1998 02:51:02 +0000
Subject: Consistency:  In two places, change {\it ...} to \emph{...}.

---
 Doc/lib/libamoeba.tex | 4 ++--
 Doc/libamoeba.tex     | 4 ++--
 2 files changed, 4 insertions(+), 4 deletions(-)

diff --git a/Doc/lib/libamoeba.tex b/Doc/lib/libamoeba.tex
index 1ff5bd4..1f7015f 100644
--- a/Doc/lib/libamoeba.tex
+++ b/Doc/lib/libamoeba.tex
@@ -72,9 +72,9 @@ Initially, the timeout is set to 2 seconds by the Python interpreter.
 
 Capabilities are written in a convenient \ASCII{} format, also used by the
 Amoeba utilities
-{\it c2a}(U)
+\emph{c2a}(U)
 and
-{\it a2c}(U).
+\emph{a2c}(U).
 For example:
 
 \bcode\begin{verbatim}
diff --git a/Doc/libamoeba.tex b/Doc/libamoeba.tex
index 1ff5bd4..1f7015f 100644
--- a/Doc/libamoeba.tex
+++ b/Doc/libamoeba.tex
@@ -72,9 +72,9 @@ Initially, the timeout is set to 2 seconds by the Python interpreter.
 
 Capabilities are written in a convenient \ASCII{} format, also used by the
 Amoeba utilities
-{\it c2a}(U)
+\emph{c2a}(U)
 and
-{\it a2c}(U).
+\emph{a2c}(U).
 For example:
 
 \bcode\begin{verbatim}
-- 
cgit v0.12

