From 8a2adcf8128d0039a9542b550836c11c1b79a0c6 Mon Sep 17 00:00:00 2001
From: Fred Drake <fdrake@acm.org>
Date: Mon, 23 Jul 2001 19:20:56 +0000
Subject: Typo:  Added missing "if". This is part of SF patch #442788.

---
 Doc/lib/libos.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

diff --git a/Doc/lib/libos.tex b/Doc/lib/libos.tex
index b6e0bfa..dc250a1 100644
--- a/Doc/lib/libos.tex
+++ b/Doc/lib/libos.tex
@@ -995,7 +995,7 @@ and no way to retrieve the application's exit status.  The \var{path}
 parameter is relative to the current directory.  If you want to use an
 absolute path, make sure the first character is not a slash
 (\character{/}); the underlying Win32 \cfunction{ShellExecute()}
-function doesn't work it is.  Use the \function{os.path.normpath()}
+function doesn't work if it is.  Use the \function{os.path.normpath()}
 function to ensure that the path is properly encoded for Win32.
 Availability: Windows.
 \versionadded{2.0}
-- 
cgit v0.12

