From 0e448073d6afed4806a8dbd3261057a681023993 Mon Sep 17 00:00:00 2001
From: Tim Peters <tim.peters@gmail.com>
Date: Thu, 26 Aug 2004 01:02:08 +0000
Subject: Restored half of a \versionadded only half of which should have been
 deleted.

---
 Doc/lib/libdoctest.tex | 3 +++
 1 file changed, 3 insertions(+)

diff --git a/Doc/lib/libdoctest.tex b/Doc/lib/libdoctest.tex
index 8951821..0db5d5d 100644
--- a/Doc/lib/libdoctest.tex
+++ b/Doc/lib/libdoctest.tex
@@ -293,6 +293,9 @@ rewritten example, the use of \samp{...} is independent of doctest's
 \constant{ELLIPSIS} option.  The ellipsis in that example could
 be left out, or could just as well be three (or three hundred) commas.
 
+\versionchanged[The ability to handle a multi-line exception detail
+                was added]{2.4}
+
 \subsection{Option Flags and Directives\label{doctest-options}}
 
 A number of option flags control various aspects of doctest's comparison
-- 
cgit v0.12

