From 01d5d94020fe2d8c828f9b65c1e985c0734dbd97 Mon Sep 17 00:00:00 2001
From: Fred Drake <fdrake@acm.org>
Date: Mon, 30 Nov 1998 17:33:38 +0000
Subject: Remove cruft from the old Texinfo conversion.  This simplifies some
 of the newer processing.

---
 Doc/lib/libaudioop.tex | 10 ----------
 1 file changed, 10 deletions(-)

diff --git a/Doc/lib/libaudioop.tex b/Doc/lib/libaudioop.tex
index 2a3e9b0..7bcc8ed 100644
--- a/Doc/lib/libaudioop.tex
+++ b/Doc/lib/libaudioop.tex
@@ -176,20 +176,10 @@ Reverse the samples in a fragment and returns the modified fragment.
 
 \begin{funcdesc}{rms}{fragment, width}
 Return the root-mean-square of the fragment, i.e.
-%begin{latexonly}
-\iftexi
-%end{latexonly}
-the square root of the quotient of the sum of all squared sample value,
-divided by the sumber of samples.
-%begin{latexonly}
-\else
-% in eqn: sqrt { sum S sub i sup 2  over n }
 \begin{displaymath}
 \catcode`_=8
 \sqrt{\frac{\sum{{S_{i}}^{2}}}{n}}
 \end{displaymath}
-\fi
-%end{latexonly}
 This is a measure of the power in an audio signal.
 \end{funcdesc}
 
-- 
cgit v0.12

