From 7be8fcb42a585a6ca4d0dab8bd527d8765b4a8b1 Mon Sep 17 00:00:00 2001
From: Fred Drake <fdrake@acm.org>
Date: Thu, 12 Mar 1998 06:47:48 +0000
Subject: Use \envvar{FOO} instead of \code{\$FOO}.

---
 Doc/lib/libuser.tex | 5 +++--
 Doc/libuser.tex     | 5 +++--
 2 files changed, 6 insertions(+), 4 deletions(-)

diff --git a/Doc/lib/libuser.tex b/Doc/lib/libuser.tex
index 67317a2..2ed7f62 100644
--- a/Doc/lib/libuser.tex
+++ b/Doc/lib/libuser.tex
@@ -6,7 +6,8 @@
 
 As a policy, Python doesn't run user-specified code on startup of
 Python programs.  (Only interactive sessions execute the script
-specified in the \code{PYTHONSTARTUP} environment variable if it exists).
+specified in the \envvar{PYTHONSTARTUP} environment variable if it
+exists).
 
 However, some programs or sites may find it convenient to allow users
 to have a standard customization file, which gets run when a program
@@ -23,7 +24,7 @@ home directory and if it can be opened, exececutes it (using
 module \module{user}'s) global namespace.  Errors during this phase
 are not caught; that's up to the program that imports the
 \module{user} module, if it wishes.  The home directory is assumed to
-be named by the \code{HOME} environment variable; if this is not set,
+be named by the \envvar{HOME} environment variable; if this is not set,
 the current directory is used.
 
 The user's \file{.pythonrc.py} could conceivably test for
diff --git a/Doc/libuser.tex b/Doc/libuser.tex
index 67317a2..2ed7f62 100644
--- a/Doc/libuser.tex
+++ b/Doc/libuser.tex
@@ -6,7 +6,8 @@
 
 As a policy, Python doesn't run user-specified code on startup of
 Python programs.  (Only interactive sessions execute the script
-specified in the \code{PYTHONSTARTUP} environment variable if it exists).
+specified in the \envvar{PYTHONSTARTUP} environment variable if it
+exists).
 
 However, some programs or sites may find it convenient to allow users
 to have a standard customization file, which gets run when a program
@@ -23,7 +24,7 @@ home directory and if it can be opened, exececutes it (using
 module \module{user}'s) global namespace.  Errors during this phase
 are not caught; that's up to the program that imports the
 \module{user} module, if it wishes.  The home directory is assumed to
-be named by the \code{HOME} environment variable; if this is not set,
+be named by the \envvar{HOME} environment variable; if this is not set,
 the current directory is used.
 
 The user's \file{.pythonrc.py} could conceivably test for
-- 
cgit v0.12

