From 26f55a1473a639bc2506f7d7fded2e95303108b4 Mon Sep 17 00:00:00 2001
From: Neal Norwitz <nnorwitz@gmail.com>
Date: Fri, 3 Mar 2006 00:43:06 +0000
Subject: Add test_quopri to know spurious leakers

---
 Misc/build.sh | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

diff --git a/Misc/build.sh b/Misc/build.sh
index 55aad7b..1dd6c80 100755
--- a/Misc/build.sh
+++ b/Misc/build.sh
@@ -59,7 +59,7 @@ REFLOG="build/reflog.txt.out"
 # test_generators really leaks.  Since test_generators probably won't
 # be fixed real soon, disable warning about it for now.
 # The entire leak report will be mailed if any test not in this list leaks.
-LEAKY_TESTS="test_(capi|cfgparser|charmapcodec|cmd_line|compiler|filecmp|generators|threaded_import|threadedtempfile|threading|threading_local|urllib2)"
+LEAKY_TESTS="test_(capi|cfgparser|charmapcodec|cmd_line|compiler|filecmp|generators|quopri|threaded_import|threadedtempfile|threading|threading_local|urllib2)"
 
 # Change this flag to "yes" for old releases to just update/build the docs.
 BUILD_DISABLED="no"
-- 
cgit v0.12

