From c8081e9bfa47bbb8278b465d9da6d1097d68341a Mon Sep 17 00:00:00 2001
From: Jack Jansen <jack.jansen@cwi.nl>
Date: Sat, 15 Jul 2000 22:29:30 +0000
Subject: Modified the standard mac preamble so we include pymactoolbox.h in
 stead of defining lots of function prototypes in each module.

---
 Tools/bgen/bgen/macsupport.py | 36 +-----------------------------------
 1 file changed, 1 insertion(+), 35 deletions(-)

diff --git a/Tools/bgen/bgen/macsupport.py b/Tools/bgen/bgen/macsupport.py
index 5259f05..edaa535 100644
--- a/Tools/bgen/bgen/macsupport.py
+++ b/Tools/bgen/bgen/macsupport.py
@@ -100,42 +100,8 @@ VarVarOutBuffer = VarVarHeapOutputBufferType('char', 'long', 'l') # (buf, len, &
 
 # Stuff added immediately after the system include files
 includestuff = """
-#define SystemSevenOrLater 1
-
 #include "macglue.h"
-#include <Memory.h>
-#include <Dialogs.h>
-#include <Menus.h>
-#include <Controls.h>
-
-extern PyObject *ResObj_New(Handle);
-extern int ResObj_Convert(PyObject *, Handle *);
-extern PyObject *OptResObj_New(Handle);
-extern int OptResObj_Convert(PyObject *, Handle *);
-
-extern PyObject *WinObj_New(WindowPtr);
-extern int WinObj_Convert(PyObject *, WindowPtr *);
-extern PyTypeObject Window_Type;
-#define WinObj_Check(x) ((x)->ob_type == &Window_Type)
-
-extern PyObject *DlgObj_New(DialogPtr);
-extern int DlgObj_Convert(PyObject *, DialogPtr *);
-extern PyTypeObject Dialog_Type;
-#define DlgObj_Check(x) ((x)->ob_type == &Dialog_Type)
-
-extern PyObject *MenuObj_New(MenuHandle);
-extern int MenuObj_Convert(PyObject *, MenuHandle *);
-
-extern PyObject *CtlObj_New(ControlHandle);
-extern int CtlObj_Convert(PyObject *, ControlHandle *);
-
-extern PyObject *GrafObj_New(GrafPtr);
-extern int GrafObj_Convert(PyObject *, GrafPtr *);
-
-extern PyObject *BMObj_New(BitMapPtr);
-extern int BMObj_Convert(PyObject *, BitMapPtr *);
-
-extern PyObject *WinObj_WhichWindow(WindowPtr);
+#include "pymactoolbox.h"
 """
 
 # Stuff added just before the module's init function
-- 
cgit v0.12

