From 3fded4bb29356d407b3514612a3cfaf5e9e344bd Mon Sep 17 00:00:00 2001
From: Fredrik Lundh <fredrik@pythonware.com>
Date: Sat, 15 Jul 2000 20:58:44 +0000
Subject: -- fixed the comment, too

---
 Lib/site.py | 6 +++---
 1 file changed, 3 insertions(+), 3 deletions(-)

diff --git a/Lib/site.py b/Lib/site.py
index 34be9ec..b69d30d 100644
--- a/Lib/site.py
+++ b/Lib/site.py
@@ -120,9 +120,9 @@ __builtin__.quit = __builtin__.exit = exit
 del exit
 
 #
-# Set the string encoding used by the Unicode implementation to the
-# encoding used by the default locale of this system. If the default
-# encoding cannot be determined or is unknown, it defaults to 'ascii'.
+# Set the string encoding used by the Unicode implementation.  The
+# default is 'ascii', but if you're willing to experiment, you can
+# change this.
 
 encoding = "ascii" # default
 
-- 
cgit v0.12

