From e9d719b691b9a95d117e2fa2bf0331e99bfcfab2 Mon Sep 17 00:00:00 2001
From: Anthony Baxter <anthonybaxter@gmail.com>
Date: Tue, 30 Nov 2004 01:49:18 +0000
Subject: update gcc ref

---
 README | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

diff --git a/README b/README
index 1fe2e0e..060e81e 100644
--- a/README
+++ b/README
@@ -217,7 +217,7 @@ are probably experiencing compiler bugs, usually related to
 optimization.  This is a common problem with some versions of gcc, and
 some vendor-supplied compilers, which can sometimes be worked around
 by turning off optimization.  Consider switching to stable versions
-(gcc 2.95.2, or contact your vendor.)
+(gcc 2.95.2, gcc 3.x, or contact your vendor.)
 
 From Python 2.0 onward, all Python C code is ANSI C.  Compiling using
 old K&R-C-only compilers is no longer possible.  ANSI C compilers are
-- 
cgit v0.12

