From 62b887156134a2f62011dc5603f8646e5ffbe501 Mon Sep 17 00:00:00 2001
From: Guido van Rossum <guido@python.org>
Date: Wed, 9 May 2007 23:45:09 +0000
Subject: Don't insist on cStringIO.

---
 Lib/test/regrtest.py | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

diff --git a/Lib/test/regrtest.py b/Lib/test/regrtest.py
index 87d9dc9..331b441 100755
--- a/Lib/test/regrtest.py
+++ b/Lib/test/regrtest.py
@@ -128,7 +128,7 @@ import getopt
 import random
 import warnings
 import re
-import cStringIO
+import StringIO
 import traceback
 
 # I see no other way to suppress these warnings;
@@ -540,7 +540,7 @@ def runtest_inner(test, generate, verbose, quiet,
     if verbose:
         cfp = None
     else:
-        cfp = cStringIO.StringIO()
+        cfp = StringIO.StringIO()  # XXX Should use io.StringIO()
 
     try:
         save_stdout = sys.stdout
-- 
cgit v0.12

