From f07e42c159bd308b1c5691f211faa773be3bbc90 Mon Sep 17 00:00:00 2001
From: Georg Brandl <georg@python.org>
Date: Mon, 20 Feb 2006 10:32:05 +0000
Subject: Bug #1101233: fix test_fcntl on netbsd2 platform.

---
 Lib/test/test_fcntl.py | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

diff --git a/Lib/test/test_fcntl.py b/Lib/test/test_fcntl.py
index 2d176ea..8835ea3 100755
--- a/Lib/test/test_fcntl.py
+++ b/Lib/test/test_fcntl.py
@@ -20,7 +20,7 @@ else:
 if sys.platform.startswith('atheos'):
     start_len = "qq"
 
-if sys.platform in ('netbsd1', 'Darwin1.2', 'darwin',
+if sys.platform in ('netbsd1', 'netbsd2', 'Darwin1.2', 'darwin',
                     'freebsd2', 'freebsd3', 'freebsd4', 'freebsd5', 'freebsd6',
                     'bsdos2', 'bsdos3', 'bsdos4',
                     'openbsd', 'openbsd2', 'openbsd3'):
-- 
cgit v0.12

