From 740f80029c54ec9db1e1b9c8404f698e3be115e5 Mon Sep 17 00:00:00 2001
From: Fred Drake <fdrake@acm.org>
Date: Mon, 30 Dec 2002 23:00:36 +0000
Subject: - fix use of \refmodule markup - correct some module names, add
 hyperlinks - wrap some long lines

---
 Doc/lib/libdummythread.tex    |  8 ++++----
 Doc/lib/libdummythreading.tex | 10 +++++-----
 Doc/lib/libthread.tex         |  5 +++--
 Doc/lib/libthreading.tex      |  5 +++--
 4 files changed, 15 insertions(+), 13 deletions(-)

diff --git a/Doc/lib/libdummythread.tex b/Doc/lib/libdummythread.tex
index 56e3a03..f6b4c56 100644
--- a/Doc/lib/libdummythread.tex
+++ b/Doc/lib/libdummythread.tex
@@ -2,11 +2,11 @@
          Drop-in replacement for the \module{thread} module}
 
 \declaremodule[dummythread]{standard}{dummy_thread}
-\modulesynopsis{Drop-in replacement for the thread module.}
+\modulesynopsis{Drop-in replacement for the \refmodule{thread} module.}
 
-This module provides a duplicate interface to the \refmodule{thread} module. It
-is meant to be imported when the \module{thread} module is not provided on a
-platform.
+This module provides a duplicate interface to the \refmodule{thread}
+module.  It is meant to be imported when the \refmodule{thread} module
+is not provided on a platform.
 
 Suggested usage is:
 
diff --git a/Doc/lib/libdummythreading.tex b/Doc/lib/libdummythreading.tex
index 7eb7076..874f596 100644
--- a/Doc/lib/libdummythreading.tex
+++ b/Doc/lib/libdummythreading.tex
@@ -1,12 +1,12 @@
-\section{\module{dummy_thread} ---
+\section{\module{dummy_threading} ---
          Drop-in replacement for the \module{threading} module}
 
 \declaremodule[dummythreading]{standard}{dummy_threading}
-\modulesynopsis{Drop-in replacement for the threading module.}
+\modulesynopsis{Drop-in replacement for the \refmodule{threading} module.}
 
-This module provides a duplicate interface to the \refmodule{threading} module. It
-is meant to be imported when the \module{threading} module is not provided on a
-platform.
+This module provides a duplicate interface to the
+\refmodule{threading} module.  It is meant to be imported when the
+\refmodule{thread} module is not provided on a platform.
 
 Suggested usage is:
 
diff --git a/Doc/lib/libthread.tex b/Doc/lib/libthread.tex
index 6dfd875..87aa3ea 100644
--- a/Doc/lib/libthread.tex
+++ b/Doc/lib/libthread.tex
@@ -18,8 +18,9 @@ semaphores}) are provided.
 The module is optional.  It is supported on Windows, Linux, SGI
 IRIX, Solaris 2.x, as well as on systems that have a \POSIX{} thread
 (a.k.a. ``pthread'') implementation.  For systems lacking the \module{thread}
-module, the \refmodule{dummy_thread} module is available.  It duplicates this
-module's interface and can be used as a drop-in replacement.
+module, the \refmodule[dummythread]{dummy_thread} module is available.
+It duplicates this module's interface and can be
+used as a drop-in replacement.
 \index{pthreads}
 \indexii{threads}{\POSIX}
 
diff --git a/Doc/lib/libthreading.tex b/Doc/lib/libthreading.tex
index 4961829..478ca84 100644
--- a/Doc/lib/libthreading.tex
+++ b/Doc/lib/libthreading.tex
@@ -8,8 +8,9 @@
 This module constructs higher-level threading interfaces on top of the 
 lower level \refmodule{thread} module.
 
-The \refmodule{dummy_threading} module is provided for situations where
-\module{threading} cannot be used because \module{thread} is missing.
+The \refmodule[dummythreading]{dummy_threading} module is provided for
+situations where \module{threading} cannot be used because
+\refmodule{thread} is missing.
 
 This module is safe for use with \samp{from threading import *}.  It
 defines the following functions and objects:
-- 
cgit v0.12

