From 8083c176a3e7c31996f06bb209bedd448145e87c Mon Sep 17 00:00:00 2001
From: Guido van Rossum <guido@python.org>
Date: Sun, 8 Feb 1998 22:51:09 +0000
Subject: Add a note about rounding up of readlines()' sizehint to 8K.

---
 Doc/lib/libtypes.tex | 3 ++-
 Doc/libtypes.tex     | 3 ++-
 2 files changed, 4 insertions(+), 2 deletions(-)

diff --git a/Doc/lib/libtypes.tex b/Doc/lib/libtypes.tex
index 6cb66f9..dfe1ecb 100644
--- a/Doc/lib/libtypes.tex
+++ b/Doc/lib/libtypes.tex
@@ -737,7 +737,8 @@ descriptors, e.g. module \code{fcntl} or \code{os.read()} and friends.
   Read until \EOF{} using \code{readline()} and return a list containing
   the lines thus read.  If the optional \var{sizehint} argument is
   present, instead of reading up to \EOF{}, whole lines totalling
-  approximately \var{sizehint} bytes are read.
+  approximately \var{sizehint} bytes (possibly after rounding up to an
+  internal buffer size) are read.
 \end{funcdesc}
 
 \begin{funcdesc}{seek}{offset\, whence}
diff --git a/Doc/libtypes.tex b/Doc/libtypes.tex
index 6cb66f9..dfe1ecb 100644
--- a/Doc/libtypes.tex
+++ b/Doc/libtypes.tex
@@ -737,7 +737,8 @@ descriptors, e.g. module \code{fcntl} or \code{os.read()} and friends.
   Read until \EOF{} using \code{readline()} and return a list containing
   the lines thus read.  If the optional \var{sizehint} argument is
   present, instead of reading up to \EOF{}, whole lines totalling
-  approximately \var{sizehint} bytes are read.
+  approximately \var{sizehint} bytes (possibly after rounding up to an
+  internal buffer size) are read.
 \end{funcdesc}
 
 \begin{funcdesc}{seek}{offset\, whence}
-- 
cgit v0.12

