From 2510d220482fa258d0ffe0d7ed5f5749550fb2bd Mon Sep 17 00:00:00 2001
From: Fred Drake <fdrake@acm.org>
Date: Mon, 2 Nov 1998 18:57:34 +0000
Subject: Clarify the default buffering for open().  (Comment from Andrew Dalke
 <dalke@bioreason.com>).

---
 Doc/lib/libfuncs.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

diff --git a/Doc/lib/libfuncs.tex b/Doc/lib/libfuncs.tex
index 8914883..38e073f 100644
--- a/Doc/lib/libfuncs.tex
+++ b/Doc/lib/libfuncs.tex
@@ -406,7 +406,7 @@ buffer size: 0 means unbuffered, 1 means line buffered, any other
 positive value means use a buffer of (approximately) that size.  A
 negative \var{bufsize} means to use the system default, which is
 usually line buffered for for tty devices and fully buffered for other
-files.%
+files.  If omitted, the system default is used.%
 \footnote{Specifying a buffer size currently has no effect on systems
 that don't have \cfunction{setvbuf()}.  The interface to specify the buffer
 size is not done using a method that calls \cfunction{setvbuf()}, because
-- 
cgit v0.12

