From 665dd704a32ffb752e5eed640b90fcd235ae4e5c Mon Sep 17 00:00:00 2001
From: Fred Drake <fdrake@acm.org>
Date: Thu, 6 Apr 2000 14:45:19 +0000
Subject: Note the exception raised when parameter to chr() is out of range.

---
 Doc/lib/libfuncs.tex | 3 ++-
 1 file changed, 2 insertions(+), 1 deletion(-)

diff --git a/Doc/lib/libfuncs.tex b/Doc/lib/libfuncs.tex
index 2fba45a..1aedf64 100644
--- a/Doc/lib/libfuncs.tex
+++ b/Doc/lib/libfuncs.tex
@@ -102,7 +102,8 @@ class instances are callable if they have a \method{__call__()} method.
   Return a string of one character whose \ASCII{} code is the integer
   \var{i}, e.g., \code{chr(97)} returns the string \code{'a'}.  This is the
   inverse of \function{ord()}.  The argument must be in the range [0..255],
-  inclusive.
+  inclusive; \exception{ValueError} will be raised if \var{i} is
+  outside that range.
 \end{funcdesc}
 
 \begin{funcdesc}{cmp}{x, y}
-- 
cgit v0.12

