From eea714aed41aa36b4564d8e06739f8361c0e04b1 Mon Sep 17 00:00:00 2001
From: Guido van Rossum <guido@python.org>
Date: Sun, 11 Jan 1998 18:02:19 +0000
Subject: As Jeff painfully found out, malloc(0) returns NULL on OS/2.

---
 PC/os2vacpp/config.h | 5 ++++-
 1 file changed, 4 insertions(+), 1 deletion(-)

diff --git a/PC/os2vacpp/config.h b/PC/os2vacpp/config.h
index ad7626b..373d009 100644
--- a/PC/os2vacpp/config.h
+++ b/PC/os2vacpp/config.h
@@ -556,7 +556,10 @@
 #define HAVE_STDARG_H 1
 
 /* Define if you have the <stdarg.h> prototypes.  */
-#define HAVE_STDARG_PROTOTYPES
+#define HAVE_STDARG_PROTOTYPES 1
+
+/* Define if malloc(0) returns a NULL pointer */
+#define MALLOC_ZERO_RETURNS_NULL 1
 
 /* Define if you have the <stdlib.h> header file.  */
 #define HAVE_STDLIB_H 1
-- 
cgit v0.12

