From 50e1286c00c4ca2c3187173527bbb07acd8aae2b Mon Sep 17 00:00:00 2001
From: Fred Drake <fdrake@acm.org>
Date: Mon, 8 Jul 2002 14:29:05 +0000
Subject: Fix typo:  "an Unicode string" --> "a Unicode string" Clarify the
 return value when the parameter is a Unicode object.

---
 Doc/lib/libfuncs.tex | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

diff --git a/Doc/lib/libfuncs.tex b/Doc/lib/libfuncs.tex
index 793e472..f695c3d 100644
--- a/Doc/lib/libfuncs.tex
+++ b/Doc/lib/libfuncs.tex
@@ -871,8 +871,8 @@ def my_import(name):
 
   If no optional parameters are given, \code{unicode()} will mimic the
   behaviour of \code{str()} except that it returns Unicode strings
-  instead of 8-bit strings. More precisely, if \var{object} is an
-  Unicode string or subclass it will return a Unicode string without
+  instead of 8-bit strings. More precisely, if \var{object} is a
+  Unicode string or subclass it will return that Unicode string without
   any additional decoding applied.
 
   For objects which provide a \method{__unicode__()} method, it will
-- 
cgit v0.12

