From ef13949e0059a2b1e6fd88298b73668e5cdf8c83 Mon Sep 17 00:00:00 2001
From: Fred Drake <fdrake@acm.org>
Date: Tue, 22 Jul 2003 00:49:11 +0000
Subject: Avoid a 301 permanent redirect. Part of SF patch #773007.

---
 Doc/lib/libgettext.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

diff --git a/Doc/lib/libgettext.tex b/Doc/lib/libgettext.tex
index e98d9f6..043fa58 100644
--- a/Doc/lib/libgettext.tex
+++ b/Doc/lib/libgettext.tex
@@ -442,7 +442,7 @@ The \program{pygettext}\footnote{Fran\c cois Pinard has
 written a program called
 \program{xpot} which does a similar job.  It is available as part of
 his \program{po-utils} package at
-\url{http://www.iro.umontreal.ca/contrib/po-utils/HTML}.} program
+\url{http://www.iro.umontreal.ca/contrib/po-utils/HTML/}.} program
 scans all your Python source code looking for the strings you
 previously marked as translatable.  It is similar to the GNU
 \program{gettext} program except that it understands all the
-- 
cgit v0.12

