From 145c26e3d31e48f40c8cfe7bf46e0d115104a00e Mon Sep 17 00:00:00 2001
From: Fred Drake <fdrake@acm.org>
Date: Mon, 21 Feb 2000 17:59:48 +0000
Subject: Remove comment that Guido agree's doesn't make sense:
 PyEval_EvalCode() is *not* a "backward compatible interface", it's the one to
 use!

---
 Python/ceval.c | 2 --
 1 file changed, 2 deletions(-)

diff --git a/Python/ceval.c b/Python/ceval.c
index 6463881..930b1bc 100644
--- a/Python/ceval.c
+++ b/Python/ceval.c
@@ -313,8 +313,6 @@ static enum why_code do_raise Py_PROTO((PyObject *, PyObject *, PyObject *));
 static int unpack_sequence Py_PROTO((PyObject *, int, PyObject **));
 
 
-/* Backward compatible interface */
-
 PyObject *
 PyEval_EvalCode(co, globals, locals)
 	PyCodeObject *co;
-- 
cgit v0.12

