From 82143348aa85144c03c772bf48c436e10ee37cde Mon Sep 17 00:00:00 2001
From: Fred Drake <fdrake@acm.org>
Date: Sat, 4 Apr 1998 06:28:14 +0000
Subject: Remove obsolete \setindexsubitem macro.

---
 Doc/lib/libre.tex     | 1 -
 Doc/lib/libsignal.tex | 1 -
 Doc/lib/libsys.tex    | 1 -
 Doc/libre.tex         | 1 -
 Doc/libsignal.tex     | 1 -
 Doc/libsys.tex        | 1 -
 6 files changed, 6 deletions(-)

diff --git a/Doc/lib/libre.tex b/Doc/lib/libre.tex
index a217418..424ca9c 100644
--- a/Doc/lib/libre.tex
+++ b/Doc/lib/libre.tex
@@ -268,7 +268,6 @@ for the current locale.
 
 The module defines the following functions and constants, and an exception:
 
-\setindexsubitem{(in module re)}
 
 \begin{funcdesc}{compile}{pattern\optional{, flags}}
   Compile a regular expression pattern into a regular expression
diff --git a/Doc/lib/libsignal.tex b/Doc/lib/libsignal.tex
index fd74cf8..266454f 100644
--- a/Doc/lib/libsignal.tex
+++ b/Doc/lib/libsignal.tex
@@ -62,7 +62,6 @@ communication.  Use locks instead.
 
 The variables defined in the \module{signal} module are:
 
-\setindexsubitem{(in module signal)}
 \begin{datadesc}{SIG_DFL}
   This is one of two standard signal handling options; it will simply
   perform the default function for the signal.  For example, on most
diff --git a/Doc/lib/libsys.tex b/Doc/lib/libsys.tex
index 3138180..605a63c 100644
--- a/Doc/lib/libsys.tex
+++ b/Doc/lib/libsys.tex
@@ -6,7 +6,6 @@ This module provides access to some variables used or maintained by the
 interpreter and to functions that interact strongly with the interpreter.
 It is always available.
 
-\setindexsubitem{(in module sys)}
 
 \begin{datadesc}{argv}
   The list of command line arguments passed to a Python script.
diff --git a/Doc/libre.tex b/Doc/libre.tex
index a217418..424ca9c 100644
--- a/Doc/libre.tex
+++ b/Doc/libre.tex
@@ -268,7 +268,6 @@ for the current locale.
 
 The module defines the following functions and constants, and an exception:
 
-\setindexsubitem{(in module re)}
 
 \begin{funcdesc}{compile}{pattern\optional{, flags}}
   Compile a regular expression pattern into a regular expression
diff --git a/Doc/libsignal.tex b/Doc/libsignal.tex
index fd74cf8..266454f 100644
--- a/Doc/libsignal.tex
+++ b/Doc/libsignal.tex
@@ -62,7 +62,6 @@ communication.  Use locks instead.
 
 The variables defined in the \module{signal} module are:
 
-\setindexsubitem{(in module signal)}
 \begin{datadesc}{SIG_DFL}
   This is one of two standard signal handling options; it will simply
   perform the default function for the signal.  For example, on most
diff --git a/Doc/libsys.tex b/Doc/libsys.tex
index 3138180..605a63c 100644
--- a/Doc/libsys.tex
+++ b/Doc/libsys.tex
@@ -6,7 +6,6 @@ This module provides access to some variables used or maintained by the
 interpreter and to functions that interact strongly with the interpreter.
 It is always available.
 
-\setindexsubitem{(in module sys)}
 
 \begin{datadesc}{argv}
   The list of command line arguments passed to a Python script.
-- 
cgit v0.12

