From 8de0c1716b90a28973f9c4e1e8816eaadf3b10dd Mon Sep 17 00:00:00 2001
From: Tim Peters <tim.peters@gmail.com>
Date: Wed, 28 Feb 2001 08:15:16 +0000
Subject: Removed now-unreferenced CHECK_IMPORT_CASE from Windows config.h.
 NOTE:  someone who understands Unix config should remove it from acconfig.h
 too.

---
 PC/config.h | 7 -------
 1 file changed, 7 deletions(-)

diff --git a/PC/config.h b/PC/config.h
index 65d390a..f26d0e4 100644
--- a/PC/config.h
+++ b/PC/config.h
@@ -341,13 +341,6 @@ typedef unsigned long uintptr_t;
 #define SIZEOF_LONG 4
 #define SIZEOF_LONG_LONG 8
 
-/* EXPERIMENTAL FEATURE: When CHECK_IMPORT_CASE is defined, check case of
-   imported modules against case of file; this causes "import String" to fail
-   with a NameError exception when it finds "string.py".  Normally, you set
-   the environment variable PYTHONCASEOK (to anything) to disable this
-   feature; to permanently disable it, #undef it here.  This only works on
-   case-preserving filesystems; otherwise you definitely want it off. */
-#define CHECK_IMPORT_CASE
 #endif
 
 /* Fairly standard from here! */
-- 
cgit v0.12

