From 91f5cbe264682e180216d6cafb358d5e1964d41d Mon Sep 17 00:00:00 2001
From: Raymond Hettinger <python@rcn.com>
Date: Thu, 8 Jan 2004 00:31:50 +0000
Subject: SF bug #872461:  list.extend() described as experimental

---
 Doc/lib/libstdtypes.tex | 4 +---
 1 file changed, 1 insertion(+), 3 deletions(-)

diff --git a/Doc/lib/libstdtypes.tex b/Doc/lib/libstdtypes.tex
index 925aac0..7c5cba0 100644
--- a/Doc/lib/libstdtypes.tex
+++ b/Doc/lib/libstdtypes.tex
@@ -1013,9 +1013,7 @@ Notes:
   no longer works in Python 2.0.  Use of this misfeature has been
   deprecated since Python 1.4.
 
-\item[(3)] Raises an exception when \var{x} is not a list object.  The
-  \method{extend()} method is experimental and not supported by
-  mutable sequence types other than lists.
+\item[(3)] Raises an exception when \var{x} is not a list object.
 
 \item[(4)] Raises \exception{ValueError} when \var{x} is not found in
   \var{s}. When a negative index is passed as the second or third parameter
-- 
cgit v0.12

