From d13eeb7fd272bdf856ea73d83a5d9e17b5a83322 Mon Sep 17 00:00:00 2001
From: Georg Brandl <georg@python.org>
Date: Tue, 30 Jan 2007 20:21:35 +0000
Subject: Bug #1648191: typo in docs.  (backport from rev. 53603)

---
 Doc/lib/libimageop.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

diff --git a/Doc/lib/libimageop.tex b/Doc/lib/libimageop.tex
index 27ed056..0f732bf 100644
--- a/Doc/lib/libimageop.tex
+++ b/Doc/lib/libimageop.tex
@@ -19,7 +19,7 @@ per pixel, etc.
 
 
 \begin{funcdesc}{crop}{image, psize, width, height, x0, y0, x1, y1}
-Return the selected part of \var{image}, which should by
+Return the selected part of \var{image}, which should be
 \var{width} by \var{height} in size and consist of pixels of
 \var{psize} bytes. \var{x0}, \var{y0}, \var{x1} and \var{y1} are like
 the \function{gl.lrectread()} parameters, i.e.\ the boundary is
-- 
cgit v0.12

