From 045c7fc9b9a1b53acc3a62c19a838154708a00f3 Mon Sep 17 00:00:00 2001
From: Fred Drake <fdrake@acm.org>
Date: Wed, 17 Dec 1997 13:47:39 +0000
Subject: Make the word "Module" in the section header start with an upper-case
 "M".

Remove the leading comment declaring this to be a template for module
documentation.
---
 Doc/lib/libcode.tex | 4 +---
 Doc/libcode.tex     | 4 +---
 2 files changed, 2 insertions(+), 6 deletions(-)

diff --git a/Doc/lib/libcode.tex b/Doc/lib/libcode.tex
index 5fa9717..dd62173 100644
--- a/Doc/lib/libcode.tex
+++ b/Doc/lib/libcode.tex
@@ -1,6 +1,4 @@
-% Template for a library manual section.
-
-\section{Standard module \sectcode{code}}
+\section{Standard Module \sectcode{code}}
 \label{module-code}
 \stmodindex{code}
 
diff --git a/Doc/libcode.tex b/Doc/libcode.tex
index 5fa9717..dd62173 100644
--- a/Doc/libcode.tex
+++ b/Doc/libcode.tex
@@ -1,6 +1,4 @@
-% Template for a library manual section.
-
-\section{Standard module \sectcode{code}}
+\section{Standard Module \sectcode{code}}
 \label{module-code}
 \stmodindex{code}
 
-- 
cgit v0.12

