From b6a54d2a2cd0537be8e013a96068a8ffeaee5847 Mon Sep 17 00:00:00 2001
From: Barry Warsaw <barry@python.org>
Date: Wed, 6 Dec 2000 21:47:46 +0000
Subject: _getframe(): New sys module function for getting at the stack frame.
 Implements and closes SF patch #102106, with Guido's suggested documentation
 changes.

---
 Doc/lib/libsys.tex | 11 +++++++++++
 Python/sysmodule.c | 37 +++++++++++++++++++++++++++++++++++++
 2 files changed, 48 insertions(+)

diff --git a/Doc/lib/libsys.tex b/Doc/lib/libsys.tex
index 8199b1b..2fda26e 100644
--- a/Doc/lib/libsys.tex
+++ b/Doc/lib/libsys.tex
@@ -161,6 +161,17 @@ from causing an overflow of the C stack and crashing Python.  It can
 be set by \function{setrecursionlimit()}.
 \end{funcdesc}
 
+\begin{funcdesc}{_getframe}{\optional{depth}}
+Return a frame object from the call stack.  If optional integer
+\var{depth} is given, return the frame object that many calls below
+the top of the stack.  If that is deeper than the call stack,
+\exception{ValueError} is raised.  The default for \var{depth} is
+zero, returning the frame at the top of the call stack.
+
+This function should be used for internal and specialized
+purposes only.
+\end{funcdesc}
+
 \begin{datadesc}{hexversion}
 The version number encoded as a single integer.  This is guaranteed to
 increase with each version, including proper support for
diff --git a/Python/sysmodule.c b/Python/sysmodule.c
index ade9063..b569a9a 100644
--- a/Python/sysmodule.c
+++ b/Python/sysmodule.c
@@ -15,6 +15,8 @@ Data members:
 */
 
 #include "Python.h"
+#include "compile.h"
+#include "frameobject.h"
 
 #include "osdefs.h"
 
@@ -284,6 +286,40 @@ sys_getcounts(PyObject *self, PyObject *args)
 }
 #endif
 
+static char getframe_doc[] =
+"_getframe([depth]) -> frameobject\n\
+\n\
+Return a frame object from the call stack.  If optional integer depth is\n\
+given, return the frame object that many calls below the top of the stack.\n\
+If that is deeper than the call stack, ValueError is raised.  The default\n\
+for depth is zero, returning the frame at the top of the call stack.\n\
+\n\
+This function should be used for internal and specialized\n\
+purposes only.";
+
+static PyObject *
+sys_getframe(PyObject *self, PyObject *args)
+{
+	PyFrameObject *f = PyThreadState_Get()->frame;
+	int depth = -1;
+
+	if (!PyArg_ParseTuple(args, "|i:_getframe", &depth))
+		return NULL;
+
+	while (depth > 0 && f != NULL) {
+		f = f->f_back;
+		--depth;
+	}
+	if (f == NULL) {
+		PyErr_SetString(PyExc_ValueError,
+				"call stack is not deep enough");
+		return NULL;
+	}
+	Py_INCREF(f);
+	return (PyObject*)f;
+}
+
+
 #ifdef Py_TRACE_REFS
 /* Defined in objects.c because it uses static globals if that file */
 extern PyObject *_Py_GetObjects(PyObject *, PyObject *);
@@ -313,6 +349,7 @@ static PyMethodDef sys_methods[] = {
 	{"getrefcount",	sys_getrefcount, 1, getrefcount_doc},
 	{"getrecursionlimit", sys_getrecursionlimit, 1,
 	 getrecursionlimit_doc},
+	{"_getframe", sys_getframe, 1, getframe_doc},
 #ifdef USE_MALLOPT
 	{"mdebug",	sys_mdebug, 1},
 #endif
-- 
cgit v0.12

