From 90df06e5e2cf839d94e54bad57e524dca2a3ec42 Mon Sep 17 00:00:00 2001
From: George Yoshida <dynkin@gmail.com>
Date: Sat, 13 May 2006 06:53:31 +0000
Subject: Add \exception markup

---
 Doc/lib/libthread.tex   | 4 ++--
 Doc/lib/libtokenize.tex | 2 +-
 2 files changed, 3 insertions(+), 3 deletions(-)

diff --git a/Doc/lib/libthread.tex b/Doc/lib/libthread.tex
index 9e0c202..9573ab3 100644
--- a/Doc/lib/libthread.tex
+++ b/Doc/lib/libthread.tex
@@ -44,8 +44,8 @@ then the thread exits (but other threads continue to run).
 \end{funcdesc}
 
 \begin{funcdesc}{interrupt_main}{}
-Raise a KeyboardInterrupt in the main thread.  A subthread can use this
-function to interrupt the main thread.
+Raise a \exception{KeyboardInterrupt} exception in the main thread.  A subthread
+can use this function to interrupt the main thread.
 \versionadded{2.3}
 \end{funcdesc}
 
diff --git a/Doc/lib/libtokenize.tex b/Doc/lib/libtokenize.tex
index cdbb4b8..8c9ad3e 100644
--- a/Doc/lib/libtokenize.tex
+++ b/Doc/lib/libtokenize.tex
@@ -47,7 +47,7 @@ An older entry point is retained for backward compatibility:
   call to the function should return one line of input as a string.
   Alternately, \var{readline} may be a callable object that signals
   completion by raising \exception{StopIteration}.
-  \versionchanged[Added StopIteration support]{2.5}
+  \versionchanged[Added \exception{StopIteration} support]{2.5}
 
   The second parameter, \var{tokeneater}, must also be a callable
   object.  It is called once for each token, with five arguments,
-- 
cgit v0.12

