From e693df94ed50e5083742b8c3bcb490c6b7fe03ac Mon Sep 17 00:00:00 2001
From: Fred Drake <fdrake@acm.org>
Date: Tue, 10 Oct 2000 21:10:35 +0000
Subject: Avoid a couple of "value computed is not used" warnings from gcc
 -Wall; these computations are required for their side effects in traversing
 the variable arguments list.

Reported by Marc-Andre Lemburg <mal@lemburg.com>.
---
 Python/errors.c | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

diff --git a/Python/errors.c b/Python/errors.c
index ba58790..28dfbbe 100644
--- a/Python/errors.c
+++ b/Python/errors.c
@@ -406,13 +406,13 @@ PyErr_Format(PyObject *exception, const char *format, ...)
 				;
 			switch (*f) {
 			case 'c':
-				va_arg(vargs, int);
+				(void) va_arg(vargs, int);
 				/* fall through... */
 			case '%':
 				n++;
 				break;
 			case 'd': case 'i': case 'x':
-				va_arg(vargs, int);
+				(void) va_arg(vargs, int);
 				/* 20 bytes should be enough to hold a 64-bit
 				   integer */
 				n = n + 20;
-- 
cgit v0.12

