From 73ec2c008161fb2845c2a87314ede00db0d31c27 Mon Sep 17 00:00:00 2001
From: Guido van Rossum <guido@python.org>
Date: Thu, 27 Nov 1997 01:39:15 +0000
Subject: Slip of the keyboard (f__ should be __).  Dunno why I had a totally
 messed up (but not checked in) version in my work files and didn't notice
 before releasing 1.5 -- at least the distributed latex file doesn't have the
 bogus warning about changed __init__ semantics.

---
 Doc/lib/libni.tex | 2 +-
 Doc/libni.tex     | 2 +-
 2 files changed, 2 insertions(+), 2 deletions(-)

diff --git a/Doc/lib/libni.tex b/Doc/lib/libni.tex
index eecbe19..c564373 100644
--- a/Doc/lib/libni.tex
+++ b/Doc/lib/libni.tex
@@ -4,7 +4,7 @@
 
 \strong{Warning: This module is obsolete.}  As of Python 1.5a4,
 package support (with different semantics for \code{__init__} and no
-support for \code{__domain__} or\code{f__}) is built in the
+support for \code{__domain__} or\code{__}) is built in the
 interpreter.  The ni module is retained only for backward
 compatibility.
 
diff --git a/Doc/libni.tex b/Doc/libni.tex
index eecbe19..c564373 100644
--- a/Doc/libni.tex
+++ b/Doc/libni.tex
@@ -4,7 +4,7 @@
 
 \strong{Warning: This module is obsolete.}  As of Python 1.5a4,
 package support (with different semantics for \code{__init__} and no
-support for \code{__domain__} or\code{f__}) is built in the
+support for \code{__domain__} or\code{__}) is built in the
 interpreter.  The ni module is retained only for backward
 compatibility.
 
-- 
cgit v0.12

