From 7baf3d4ea739129762d69d1c7f3aad18f8e6e8d8 Mon Sep 17 00:00:00 2001
From: Fred Drake <fdrake@acm.org>
Date: Fri, 20 Feb 1998 00:45:52 +0000
Subject: Fixed typo reported by Vladimir Marangozov
 <Vladimir.Marangozov@imag.fr>.

---
 Doc/api.tex     | 2 +-
 Doc/api/api.tex | 2 +-
 2 files changed, 2 insertions(+), 2 deletions(-)

diff --git a/Doc/api.tex b/Doc/api.tex
index 068add8..ade73cf 100644
--- a/Doc/api.tex
+++ b/Doc/api.tex
@@ -2510,7 +2510,7 @@ The Python interpreter is not fully thread safe.  In order to support
 multi-threaded Python programs, there's a global lock that must be
 held by the current thread before it can safely access Python objects.
 Without the lock, even the simplest operations could cause problems in
-a multi-threaded proram: for example, when two threads simultaneously
+a multi-threaded program: for example, when two threads simultaneously
 increment the reference count of the same object, the reference count
 could end up being incremented only once instead of twice.
 
diff --git a/Doc/api/api.tex b/Doc/api/api.tex
index 068add8..ade73cf 100644
--- a/Doc/api/api.tex
+++ b/Doc/api/api.tex
@@ -2510,7 +2510,7 @@ The Python interpreter is not fully thread safe.  In order to support
 multi-threaded Python programs, there's a global lock that must be
 held by the current thread before it can safely access Python objects.
 Without the lock, even the simplest operations could cause problems in
-a multi-threaded proram: for example, when two threads simultaneously
+a multi-threaded program: for example, when two threads simultaneously
 increment the reference count of the same object, the reference count
 could end up being incremented only once instead of twice.
 
-- 
cgit v0.12

