From da1ad32cec753fb8db779c20897b5fd288381fe7 Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?Walter=20D=C3=B6rwald?= <walter@livinglogic.de>
Date: Tue, 12 Dec 2006 21:55:31 +0000
Subject: Fix typo.

---
 Lib/test/test_weakref.py | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

diff --git a/Lib/test/test_weakref.py b/Lib/test/test_weakref.py
index 18ab401..d2e4d34 100644
--- a/Lib/test/test_weakref.py
+++ b/Lib/test/test_weakref.py
@@ -189,7 +189,7 @@ class ReferencesTestCase(TestBase):
     # None as the value for the callback, where either means "no
     # callback".  The "no callback" ref and proxy objects are supposed
     # to be shared so long as they exist by all callers so long as
-    # they are active.  In Python 2.3.3 and earlier, this guaranttee
+    # they are active.  In Python 2.3.3 and earlier, this guarantee
     # was not honored, and was broken in different ways for
     # PyWeakref_NewRef() and PyWeakref_NewProxy().  (Two tests.)
 
-- 
cgit v0.12

