From 93503ca57b839e4bd82acfbbe0340191060b4016 Mon Sep 17 00:00:00 2001
From: Fred Drake <fdrake@acm.org>
Date: Fri, 12 Mar 1999 16:24:22 +0000
Subject: Fixup the module keys.  There were some problems with hosting /
 processing file HTML files on Windows machines do to case insensitivity.

---
 Doc/lib/libal.tex     | 8 +++-----
 Doc/lib/libfl.tex     | 2 +-
 Doc/lib/libgl.tex     | 2 +-
 Doc/lib/libpopen2.tex | 2 +-
 4 files changed, 6 insertions(+), 8 deletions(-)

diff --git a/Doc/lib/libal.tex b/Doc/lib/libal.tex
index 1936601..b0e0169 100644
--- a/Doc/lib/libal.tex
+++ b/Doc/lib/libal.tex
@@ -60,8 +60,7 @@ list such as returned by \function{queryparams()}.
 \end{funcdesc}
 
 
-\subsection{Configuration Objects}
-\label{al-config-objects}
+\subsection{Configuration Objects \label{al-config-objects}}
 
 Configuration objects (returned by \function{newconfig()} have the
 following methods:
@@ -107,8 +106,7 @@ Set the maximum value for floating sample formats.
 \end{methoddesc}
 
 
-\subsection{Port Objects}
-\label{al-port-objects}
+\subsection{Port Objects \label{al-port-objects}}
 
 Port objects, as returned by \function{openport()}, have the following
 methods:
@@ -166,7 +164,7 @@ Get status information on last error.
 \section{\module{AL} ---
          Constants used with the \module{al} module}
 
-\declaremodule{standard}{AL}
+\declaremodule[al-constants]{standard}{AL}
   \platform{IRIX}
 \modulesynopsis{Constants used with the \module{al} module.}
 
diff --git a/Doc/lib/libfl.tex b/Doc/lib/libfl.tex
index ef9d841..127e397 100644
--- a/Doc/lib/libfl.tex
+++ b/Doc/lib/libfl.tex
@@ -470,7 +470,7 @@ FORMS objects have these data attributes; see the FORMS documentation:
 \section{\module{FL} ---
          Constants used with the \module{fl} module}
 
-\declaremodule{standard}{FL}
+\declaremodule[fl-constants]{standard}{FL}
   \platform{IRIX}
 \modulesynopsis{Constants used with the \module{fl} module.}
 
diff --git a/Doc/lib/libgl.tex b/Doc/lib/libgl.tex
index b9fbc2d..0c0f578 100644
--- a/Doc/lib/libgl.tex
+++ b/Doc/lib/libgl.tex
@@ -204,7 +204,7 @@ Read the module source file for details.
 \section{\module{GL} ---
          Constants used with the \module{gl} module}
 
-\declaremodule{standard}{GL}
+\declaremodule[gl-constants]{standard}{GL}
   \platform{IRIX}
 \modulesynopsis{Constants used with the \module{gl} module.}
 
diff --git a/Doc/lib/libpopen2.tex b/Doc/lib/libpopen2.tex
index 6610676..d2cc0fd 100644
--- a/Doc/lib/libpopen2.tex
+++ b/Doc/lib/libpopen2.tex
@@ -1,7 +1,7 @@
 \section{\module{popen2} ---
          Subprocesses with accessible standard I/O streams}
 
-\declaremodule[popentwo]{standard}{popen2}
+\declaremodule{standard}{popen2}
   \platform{Unix}
 \modulesynopsis{Subprocesses with accessible standard I/O streams.}
 \sectionauthor{Drew Csillag}{drew_csillag@geocities.com}
-- 
cgit v0.12

