From ff52286d4a43d2a525ace6b68775f8fc60ed7a88 Mon Sep 17 00:00:00 2001
From: "Michael W. Hudson" <mwh@python.net>
Date: Fri, 27 May 2005 14:58:06 +0000
Subject: Fix test_site to not call open('...', 'wU'), as that now raises an
 error.

Is anyone running the test suite regularly at the moment?
---
 Lib/test/test_site.py | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

diff --git a/Lib/test/test_site.py b/Lib/test/test_site.py
index ba6f94d..3a8b9d3 100644
--- a/Lib/test/test_site.py
+++ b/Lib/test/test_site.py
@@ -117,7 +117,7 @@ class PthFile(object):
         Make sure to call self.cleanup() to undo anything done by this method.
 
         """
-        FILE = open(self.file_path, 'wU')
+        FILE = open(self.file_path, 'w')
         try:
             print>>FILE, "#import @bad module name"
             print>>FILE, "\n"
-- 
cgit v0.12

