From d858f70617a9df8456e89a898ad8f97bd57c09f9 Mon Sep 17 00:00:00 2001
From: Guido van Rossum <guido@python.org>
Date: Fri, 21 Apr 2006 09:17:15 +0000
Subject: Fix the problems in this test.  Boy this is a painful thing to debug
 -- it's fundamentally unmaintainable.  Should we throw away pyclbr, or
 rewrite it using the AST?

---
 Lib/test/test_pyclbr.py | 4 +++-
 1 file changed, 3 insertions(+), 1 deletion(-)

diff --git a/Lib/test/test_pyclbr.py b/Lib/test/test_pyclbr.py
index ceb7a3d..0eb7d90 100644
--- a/Lib/test/test_pyclbr.py
+++ b/Lib/test/test_pyclbr.py
@@ -57,6 +57,8 @@ class PyclbrTest(TestCase):
             ignore are ignored.   If no module is provided, the appropriate
             module is loaded with __import__.'''
 
+        ignore = set(ignore) | set(['object'])
+
         if module == None:
             # Import it.
             # ('<silly>' is to work around an API silliness in __import__)
@@ -164,7 +166,7 @@ class PyclbrTest(TestCase):
                              'getproxies_internetconfig',)) # not on all platforms
         cm('pickle')
         cm('aifc', ignore=('openfp',))  # set with = in module
-        cm('Cookie')
+        cm('Cookie', ignore=('Cookie',)) # Cookie is an alias for SmartCookie
         cm('sre_parse', ignore=('dump',)) # from sre_constants import *
         cm('pdb')
         cm('pydoc')
-- 
cgit v0.12

