From 702d08ec05ba66831b5c95a9643a7ebbb6d67795 Mon Sep 17 00:00:00 2001
From: Guido van Rossum <guido@python.org>
Date: Fri, 27 Jul 2001 16:05:32 +0000
Subject: Fix buffer_info() docstring to match reality.  See SF bug #444842.

---
 Modules/arraymodule.c | 4 +++-
 1 file changed, 3 insertions(+), 1 deletion(-)

diff --git a/Modules/arraymodule.c b/Modules/arraymodule.c
index de90da9..6168bb0 100644
--- a/Modules/arraymodule.c
+++ b/Modules/arraymodule.c
@@ -880,7 +880,9 @@ static char buffer_info_doc [] =
 "buffer_info() -> (address, length)\n\
 \n\
 Return a tuple (address, length) giving the current memory address and\n\
-the length in bytes of the buffer used to hold array's contents.";
+the length in items of the buffer used to hold array's contents\n\
+The length should be multiplied by the itemsize attribute to calculate\n\
+the buffer length in bytes.";
 
 
 static PyObject *
-- 
cgit v0.12

