From 713ade69c5ad52fdaac69d9e777b125da2cf1c75 Mon Sep 17 00:00:00 2001
From: Fred Drake <fdrake@acm.org>
Date: Fri, 5 Dec 2003 17:43:47 +0000
Subject: Add news about removal of the PendingDeprecationWarning from apply().

---
 Misc/NEWS | 3 +++
 1 file changed, 3 insertions(+)

diff --git a/Misc/NEWS b/Misc/NEWS
index 78118cf..9f57728 100644
--- a/Misc/NEWS
+++ b/Misc/NEWS
@@ -12,6 +12,9 @@ What's New in Python 2.4 alpha 1?
 Core and builtins
 -----------------
 
+- Removed PendingDeprecationWarning from apply().  apply() remains
+  deprecated, but the nuissance warning will not be issued.
+
 - At Python shutdown time (Py_Finalize()), 2.3 called cyclic garbage
   collection twice, both before and after tearing down modules.  The
   call after tearing down modules has been disabled, because too much
-- 
cgit v0.12

