From 8d2f3d66ee681a7d9a18fb854d0ecd1816edb78b Mon Sep 17 00:00:00 2001
From: Jack Jansen <jack.jansen@cwi.nl>
Date: Fri, 27 Jul 2001 09:21:28 +0000
Subject: ProgressBar crashed when you tried to drag it. Fixed. Thanks go to
 Alfonso Baciero.

---
 Mac/Lib/EasyDialogs.py | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

diff --git a/Mac/Lib/EasyDialogs.py b/Mac/Lib/EasyDialogs.py
index a9d3e16..1943908 100644
--- a/Mac/Lib/EasyDialogs.py
+++ b/Mac/Lib/EasyDialogs.py
@@ -277,7 +277,7 @@ class ProgressBar:
 					raise KeyboardInterrupt, ev
 			else:
 				if part == 4:	# inDrag 
-					self.d.DragWindow(where, screenbounds)
+					self.w.DragWindow(where, screenbounds)
 				else:
 					MacOS.HandleEvent(ev) 
 			
-- 
cgit v0.12

