From adfb94fd794f953bd4c20dc3bcdddba35f27de52 Mon Sep 17 00:00:00 2001
From: Tim Peters <tim.peters@gmail.com>
Date: Mon, 16 Oct 2000 20:51:33 +0000
Subject: Typo repair.

---
 Misc/NEWS | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

diff --git a/Misc/NEWS b/Misc/NEWS
index 2b84d9b..0d78e7f 100644
--- a/Misc/NEWS
+++ b/Misc/NEWS
@@ -77,7 +77,7 @@ Build issues
   -Wstrict-prototypes.  Users compiling Python with GCC should see
   exactly one warning, except if they have passed configure the
   --with-pydebug flag.  The expected warning is for getopt() in
-  Modules/main.c.  This will warning will be fixed for Python 2.1.
+  Modules/main.c.  This warning will be fixed for Python 2.1.
 
 - Fixed configure to add -threads argument during linking on OSF1. 
 
-- 
cgit v0.12

