From dbeaa699cd6056a8e72c3275c5cf863b6fec8f64 Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?Kristj=C3=A1n=20Valur=20J=C3=B3nsson?=
 <kristjan@ccpgames.com>
Date: Fri, 9 Jun 2006 16:28:01 +0000
Subject: Turn off warning about deprecated CRT functions on for VisualStudio
 .NET 2005. Make the definition #ARRAYSIZE conditional.  VisualStudio .NET
 2005 already has it defined using a better gimmick.

---
 Modules/posixmodule.c | 2 ++
 PC/pyconfig.h         | 6 ++++++
 2 files changed, 8 insertions(+)

diff --git a/Modules/posixmodule.c b/Modules/posixmodule.c
index c0280de..12e1c83 100644
--- a/Modules/posixmodule.c
+++ b/Modules/posixmodule.c
@@ -1227,7 +1227,9 @@ _pystat_fromstructstat(STRUCT_STAT *st)
 
 #define ISSLASHA(c) ((c) == '\\' || (c) == '/')
 #define ISSLASHW(c) ((c) == L'\\' || (c) == L'/')
+#ifndef ARRAYSIZE
 #define ARRAYSIZE(a) (sizeof(a) / sizeof(a[0]))
+#endif
 
 static BOOL
 IsUNCRootA(char *path, int pathlen)
diff --git a/PC/pyconfig.h b/PC/pyconfig.h
index cb42131..14a32db 100644
--- a/PC/pyconfig.h
+++ b/PC/pyconfig.h
@@ -164,6 +164,12 @@ typedef int pid_t;
 #define Py_IS_INFINITY(X) (!_finite(X) && !_isnan(X))
 #define Py_IS_FINITE(X) _finite(X)
 
+/* Turn off warnings about deprecated C runtime functions in 
+   VisualStudio .NET 2005 */
+#if _MSC_VER >= 1400 && !defined _CRT_SECURE_NO_DEPRECATE
+#define _CRT_SECURE_NO_DEPRECATE
+#endif
+
 #endif /* _MSC_VER */
 
 /* define some ANSI types that are not defined in earlier Win headers */
-- 
cgit v0.12

