From a8a1b9bc65ad81a75d2b9352531bf7580ca3d83f Mon Sep 17 00:00:00 2001
From: Guido van Rossum <guido@python.org>
Date: Mon, 22 Jun 1998 14:28:39 +0000
Subject: There's no point in mentioning F6 as an alternate EOF on DOS -- it
 doesn't work on modern Windows systems, and Control-Z works everywhere.

---
 Doc/tut/tut.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

diff --git a/Doc/tut/tut.tex b/Doc/tut/tut.tex
index 52e1b49..a13c939 100644
--- a/Doc/tut/tut.tex
+++ b/Doc/tut/tut.tex
@@ -173,7 +173,7 @@ lives is an installation option, other places are possible; check with
 your local Python guru or system administrator.  (E.g.,
 \file{/usr/local/python} is a popular alternative location.)
 
-Typing an EOF character (Control-D on \UNIX{}, Control-Z or F6 on DOS
+Typing an EOF character (Control-D on \UNIX{}, Control-Z on DOS
 or Windows) at the primary prompt causes the interpreter to exit with
 a zero exit status.  If that doesn't work, you can exit the
 interpreter by typing the following commands: \samp{import sys;
-- 
cgit v0.12

