From fd49a964bcb473ef20acb70d278766012bf3b577 Mon Sep 17 00:00:00 2001
From: Fred Drake <fdrake@acm.org>
Date: Sun, 11 Jan 1998 21:15:23 +0000
Subject: Follow current recommended practice in an example:  Use isinstance()
 to perform a type test instead of type(x) == types.FoobarType.  In example
 for type().

---
 Doc/lib/libfuncs.tex | 2 +-
 Doc/libfuncs.tex     | 2 +-
 2 files changed, 2 insertions(+), 2 deletions(-)

diff --git a/Doc/lib/libfuncs.tex b/Doc/lib/libfuncs.tex
index 51edb33..36582da 100644
--- a/Doc/lib/libfuncs.tex
+++ b/Doc/lib/libfuncs.tex
@@ -606,7 +606,7 @@ For instance:
 
 \bcode\begin{verbatim}
 >>> import types
->>> if type(x) == types.StringType: print "It's a string"
+>>> if isinstance(x, types.StringType): print "It's a string"
 \end{verbatim}\ecode
 \end{funcdesc}
 
diff --git a/Doc/libfuncs.tex b/Doc/libfuncs.tex
index 51edb33..36582da 100644
--- a/Doc/libfuncs.tex
+++ b/Doc/libfuncs.tex
@@ -606,7 +606,7 @@ For instance:
 
 \bcode\begin{verbatim}
 >>> import types
->>> if type(x) == types.StringType: print "It's a string"
+>>> if isinstance(x, types.StringType): print "It's a string"
 \end{verbatim}\ecode
 \end{funcdesc}
 
-- 
cgit v0.12

