From db2764d941f338028a7fdc164ed92a38768d6849 Mon Sep 17 00:00:00 2001
From: Fred Drake <fdrake@acm.org>
Date: Mon, 10 Apr 2000 18:25:09 +0000
Subject: The reference count field for PyErr_NoMemory() and
 PyErr_SetFromErrno() should be "null".

---
 Doc/api/refcounts.dat | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

diff --git a/Doc/api/refcounts.dat b/Doc/api/refcounts.dat
index 04a9d52..8da1bf2 100644
--- a/Doc/api/refcounts.dat
+++ b/Doc/api/refcounts.dat
@@ -159,7 +159,7 @@ PyErr_NewException:char*:name::
 PyErr_NewException:PyObject*:base:0:
 PyErr_NewException:PyObject*:dict:0:
 
-PyErr_NoMemory:PyObject*::0:
+PyErr_NoMemory:PyObject*::null:
 
 PyErr_NormalizeException:void:::
 PyErr_NormalizeException:PyObject**:exc::???
@@ -175,7 +175,7 @@ PyErr_Restore:PyObject*:type:0:
 PyErr_Restore:PyObject*:value:0:
 PyErr_Restore:PyObject*:traceback:0:
 
-PyErr_SetFromErrno:PyObject*:::
+PyErr_SetFromErrno:PyObject*::null:
 PyErr_SetFromErrno:PyObject*:type:0:
 
 PyErr_SetInterrupt:void:::
-- 
cgit v0.12

